ALTER TABLE `web_domain` ADD COLUMN `ssl_letsencrypt_exclude` enum('n','y') NOT NULL DEFAULT 'n' AFTER `ssl_letsencrypt`;
ALTER TABLE `remote_user` ADD `remote_access` ENUM('y','n') NOT NULL DEFAULT 'y' AFTER `remote_password`;
ALTER TABLE `remote_user` ADD `remote_ips` TEXT AFTER `remote_access`;
ALTER TABLE `server_php` ADD `active` enum('y','n') NOT NULL DEFAULT 'y' AFTER `php_fpm_pool_dir`;
ALTER TABLE `web_domain` CHANGE `log_retention` `log_retention` INT(11) NOT NULL DEFAULT '10';
